SpeedSTAR-24 driver files have been copied to your Lotus 1-2-3 directory.
At this time, perform the First-Time Installation of your Lotus product.
Remember to select the IBM EGA adapter for the initial text and graphics
screen display device.

Follow the remainder of the instructions in the SpeedSTAR-24 manual to
add the new drivers to the library.
